20-07-99 June 1999 - ATLAS Week

              Forward Calorimeter Status

         ¯ Module 0 Beam Test

        ¯ Module 0 Electrical Characteristics

        ¯ Resolution & Linearity

        ¯ Module 0 Mechanics

                                                                                                            R.S. Orr

for

                                                                                                  FCAL Group

        ¯ Lessons from Module  0

        ¯ Irradiation and LArg Purity

        ¯ Pre-production Tests -
The 1000   Tube Test

         ¯ Production Status
e ,
p