           20-07-99 June 1999 - ATLAS Week

          Electrode Spacer Test Results

·
            Module-0 Experience

                                                                     After repairing shorts 10% of first insertion

rate re-appeared on cooldown .

                                                                                                    1st Insertion  Cooldown

              short rate            after repair

FCAL1           1%               0.05%

FCAL2         20%       1.0%

·
            KTT Experience

                                                                     400V in LN2 for 2 days

                                                                                                    1st Insertion  Cooldown

              short rate            after repair

FCAL2         0.5%       0/1000