           20-07-99 June 1999 - ATLAS Week

                        Forward Calorimeter Responsibilities

FCAL1:  University of Arizona

FCAL2 and 3: Canada (Carleton, CRPP, Toronto)

                          Tungsten rods from Moscow (ITEP)

FCAL1   FCAL2    FCAL3

                                                     min

3.0 3.1 3.2

                                                     max

4.9 4.9 4.9

                                              Absorber material Cu W W

                                              Mass (t) 2.3 4.1 4.0

                                              dE / dx  sampling % 1.49 1.36 1.68

                                              Depth ( ) 2.6 3.5 3.4

                                              Gap width (mm) 0.25 0.375 0.50

                                              Drift time ( ns ) 50 75 100