% ****** Start of file apssamp.tex ******
%
%   This file is part of the APS files in the REVTeX 4 distribution.
%   Version 4.0 of REVTeX, August 2001
%
%   Copyright (c) 2001 The American Physical Society.
%
%   See the REVTeX 4 README file for restrictions and more information.
%
% TeX'ing this file requires that you have AMS-LaTeX 2.0 installed
% as well as the rest of the prerequisites for REVTeX 4.0
%
%
% This line is for the preprint style, with double spacing
% and large font and margins:
\documentclass[prd,preprint,showpacs,amsmath,amssymb]{revtex4}
% This line makes two columns like the journal:
%\documentclass[prd,twocolumn,showpacs,amsmath,amssymb]{revtex4}
% This line is most like the final typeset appearance:
%\documentclass[prd,lengthcheck,showpacs,amsmath,amssymb]{revtex4}
% This line is not too useful: single spacing, but single column:
%\documentclass[prd,showpacs,amsmath,amssymb]{revtex4}

% Use this line to get rid of most notes, for consumption by
% outside viewers.
\newcommand{\nonotes}

\ifx\pdfoutput\undefined
\usepackage[dvips]{graphicx}
\else
\usepackage[pdftex]{graphicx}
\usepackage{epstopdf}
\fi

\setkeys{Gin}{width=.9\columnwidth, height=.75\textheight,
keepaspectratio}
\usepackage{dcolumn}% Align table columns on decimal point
\usepackage{bm}% bold math
\usepackage{url}
\urlstyle{sf}
\usepackage{xspace}

\input{prdDefs.tex}

\begin{document}

\input{prdTitleAbsIntro.tex}
\input{prdDetBkgdSel.tex}
\input{prdMassRecon.tex}
\input{prdFitting.tex}
\input{prdResults.tex}
\input{prdSyst.tex}
\input{prdConcAck.tex}

\bibliographystyle{apsrev}
\bibliography{prdBiblio}

\end{document}

