)σ Input JES (

-3 -2 -1 0 1 2 3

Pull Mean

-0.6

-0.4

-0.2 0 0.2 0.4 0.6^{/ ndf2χ 4.563 / 6}

Prob 0.601 p0 0.02985 ± 0.001848

/ ndf

2χ 4.563 / 6

±