)^2

(GeV/c top Input M

150 160 170 180 190 200 210

Pull Mean

-0.6

-0.4

-0.2 0 0.2 0.4 0.6^{/ ndf2χ 9.126 / 12}

Prob 0.6921 p0 0.02109 ± -0.07004

/ ndf

2χ 9.126 / 12

±