%
%  Conclusion
%
%  Revisions:
%
%   13 Jul 05    PKS    Original version
%   13 Jul 05    EMB    Complete and add plots
%   16 Jul 05    PKS    Tidy up and incorporate 1st draft comments
%   20 Jul 05    PKS    Make corrections to 2nd draft.
%   30 Aug 05    PKS    Implement Draft 2 changes.
%

In summary, we have presented two new measurements of the top quark mass.
An analysis using the DLM method results in 
$\mtop = \gevcc{\measAStatSyst{173.2}{2.6}{2.4}{3.2}}$;
the analysis using the template technique results in
$\mtop = \gevcc{\measAStatSyst{173.5}{3.7}{3.6}{1.3}}$. 
There is a large statistical correlation between these measurements
given the common data sample
so that we quote as a result only the more accurate
measurement, the template method result of
$\mtop = \gevcc{\measAErr{173.5}{3.9}{3.8}}$.
This provides the most precise single constraint on this 
important physical parameter, exceeding the accuracy of the previous world
average for the top quark mass~\cite{r_PDBook}.

\begin{acknowledgments}
We thank the Fermilab staff and the technical staffs of the participating
institutions for their vital contributions. This work was supported by the
U.S. Department of Energy and National Science Foundation; the Italian
Istituto Nazionale di Fisica Nucleare; the Ministry of Education, Culture,
Sports, Science and Technology of Japan; the Natural Sciences and
Engineering Research Council of Canada; the National Science Council of
the Republic of China; the Swiss National Science Foundation; the A.P.
Sloan Foundation; the Bundesministerium f\"ur Bildung und Forschung,
Germany; the Korean Science and Engineering Foundation and the Korean
Research Foundation; the Particle Physics and Astronomy Research Council
and the Royal Society, UK; the Russian Foundation for Basic Research;
the Comisi\'on Interministerial de Ciencia y Tecnolog\'{\i}a, Spain;
in part by the European Community's Human Potential Programme under
contract HPRN-CT-2002-00292; and the Academy of Finland.
\end{acknowledgments}
