0 50 100 150 200 250 300 0 10 20 30 40 50 60 70 htemp Nent = 1733 Mean = 119.4 RMS = 41.16

BackThird_{htemp}

0 50 100 150 200 250 300 0

100

200

300

400

500

htemp Nent = 1733 Mean = 129.3 RMS = 33.84

MassThird_{htemp}