0 50 100 150 200 250 300 350 400 450 500 0

20

40

60

80

100 h1 Nent = 1733 Mean = 237.4 RMS = 58.42

Mass3and4_{h1}

0 1 2 3 4 5 6 7 0 50 100 150 200 250 300 350 400 450

htemp Nent = 1733 Mean = 3.319 RMS = 1.282

bbHiggsRank_{htemp}