0 50 100 150 200 250 300 350 400 450 500 0 10 20 30 40 50 60

h1 Nent = 1733 Mean = 172.6 RMS = 69.48

NoHiggsFirst_{h1}

0 50 100 150 200 250 300 350 400 450 500 0 10 20 30 40 50 60 70 80 90 h2 Nent = 1733 Mean = 125.2 RMS = 51.48

NoHiggsSecond_{h2}

0 50 100 150 200 250 300 350 400 450 500 0

20

40

60

80

100

h3 Nent = 1733 Mean = 76.86 RMS = 40.97

NoHiggsThird_{h3}