0 50 100 150 200 250 300 350 400 450 500 0

10

20

30

40

50

60 h1 Nent = 776 Mean = 54.02 RMS = 37.14

WBarPt_{h1}

-5 -4 -3 -2 -1 0 1 2 3 4 5 0 5 10 15 20 25 30 35 40 h2 Nent = 776 Mean = 0.1127 RMS = 1.224

WBarEta_{h2}