0 50 100 150 200 250 300 350 400 450 500 0 20 40 60 80 100 120 140 160 180 h1 Nent = 3466 Mean = 83.3 RMS = 50.69

Pt_W_{h1}

-5 -4 -3 -2 -1 0 1 2 3 4 5 0 20 40 60 80 100 120 140

h2 Nent = 3466 Mean = 0.004799 RMS = 1.06

Eta_W_{h2}