119.9 119.92 119.94 119.96 119.98 120 120.02 120.04 120.06 120.08 120.1 0 50 100 150 200 250 300 350 400 450

h1 Nent = 1733 Mean = 120 RMS = 0.01026

M_BhBbarh_{h1}

0 50 100 150 200 250 300 350 400 450 500 0

10

20

30

40

50

60 h2 Nent = 1733 Mean = 131.4 RMS = 69.77

M_BBbar_{h2}

0 50 100 150 200 250 300 350 400 450 500 0 10 20 30 40 50 60 70 h3 Nent = 1733 Mean = 123.2 RMS = 65.19

M_BhB_{h3}