M_A (GeV) tanβ

5σ Discovery, Suppressed Vϕ→V bb^−

2xCDF 2xDØ

Including Systematic Error

5 fb^{-1} 10 fb^{-1} 20 fb^{-1} 30 fb^{-1}

100 150 200 250 5 10 15 20 25 30 35 40 45

100 150 200 250 300