τν cs t^*b

BR(H^±) M_H± = 100 GeV

tanβ

M_H± = 120 GeV

tanβ

M_H± = 140 GeV

tanβ

M_H± = 160 GeV

tanβ

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

1 10 10^2 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

1 10 10^2

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

1 10 10^2 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

1 10 10^2