0 10 20 30 40 50 60 70 80

0 10 20 30 40 50

a)

Events / 2 GeV

Max(E_T(e),P_T(μ)) (GeV) 0 20 40 60 80 100

0 10 20 30 40 50

b)

Events / 2 GeV

Min(E_T(e),P_T(μ)) (GeV)

0 10 20 30 40 50

0 20 40 60

c)

Events / 3 GeV

E/_T (GeV) 0 10 20 30 40 50

0 50 100 150

d)

Events / 6 degrees

ΔΦ(e-μ) (Degrees)