Selection Criteria Electrons Muons Good Lepton 28,522 17,994 Lepton Isolation Requirement 20,420 11,901 Z Removal 18,700 11,310

6E_T> 20 GeV 13,657 8,724

Good Quality Run 12,797 8,272 Trigger Requirement 11,949 7,024

Table 13: The number of events passing various consecutive selection criteria in data. The good lepton requirement includes all quality selection, fiducial requirements, ET cuts, and conversion removal.

Figure 14: The transverse mass distribution for the W ! eν and W ! μν samples.