Figure 32: Distributions for a sample of electrons from photon conversions of a) PT of the electron candidate, and b) the ratio of calorimeter energy to CTC-measured momentum (E/P). Also shown are the distribution of the difference between the extrapolated position of the CTC track and the CES-cluster position in the c) azimuthal direction (Δx) and d) in the direction parallel to the beam (Δz).