P_T (GeV/c)

Tags / 2 GeV/c

M_{top}=120 GeV/c^2 M_{top}=140 GeV/c^2 M_{top}=160 GeV/c^2 M_{top}=180 GeV/c^2 overflow bin (a)

P_T (GeV/c)

Tags / 2 GeV/c

overflow bin (b)

0

0.5

1

1.5

2

0 2 4 6 8 10 12 14 16 18 20 22

0 1 2 3 4 5 6

0 2 4 6 8 10 12 14 16 18 20 22