Figure 42: Event Display for one of the SVX tagged W + multijet events; a) displays the observed calorimeter ET in the η � ϕ plane, b) shows muons hits in the CMP (circular detector just outside the tracking chamber) and CMU muon hits (the outside muon detector) as well as the charged tracks found by the CTC. Detail of tracks found by the SVX as well as the complete SVX event display are shown in c). The dashed tracks form the displaced vertex. Extranious tracks have been removed from the enlargement. The track lengths in the complete SVX event display are proportional to the tracks PT . 92