Δ

a)

E_T (GeV)

Δ

b)

E_T (GeV)

Δ

c)

E_T (GeV)

Δ

d)

E_T (GeV)

0 20 40 60 80 100

-2 -1 0 1 2 0 20 40 60 80 100 120

-2 -1 0 1 2

0 20 40 60 80 100 120

-2 -1 0 1 2 0 20 40 60 80 100 120

-2 -1 0 1 2