80.1

80.2

80.3

80.4

80.5

80.6

130 140 150 160 170 180 190 200 M_{top} (GeV/c^2)

M_W (GeV/c^2)

100 250 500 1000 Higgs Mass (GeV/c^2)

D0 CDF

LEP1,SLD,νN data

M_W-M_{top} contours : 68% CL