Review of Run 1A Results from the PRD

DIL: SVX: 6 tags. obs. Back = 2.3 g 0.3 SLT: 7 tags. obs. Back = 3.1 g 0.3

+0.25

2 evts. obs. Back = 0.56_{-0.13}

P = 0.26% (2.8σ)

M_{top} = 174 g 10_{-12} GeV/c^2 σ_{tt} (M_{top} = 174) = 13.9_{-4.8} pb +13 +6.1

Mass Plot:

*

*^{CDF Collaboration, Phys. Rev. D50, 2966 (1994)}