Experimental HEP Computing

Experimental HEP group runs workstation “cluster”

ffl SGI Crimson (4D-CRIM) file server (R4000) – 8 Gb disk – tape drive – FDDI and Thinwire ethernet ffl 3 Indigo II workstations (R4400)

– 11 and 14 Gb of SCSI disk – Exabyte tape drives – FDDI and Thinwire ffl SGI 4D-35 workstation (R3000) ffl Two processors of Irides 4D-280 (R3000) ffl Six older DEC stations ffl Seven X-terminals ffl Sun SPARC with 2 Gb disk ffl 5 PC’s for secretary and lab use

Computing Resource Needs

Group has relied on PCS to provide:

ffl System software maintenance (Varsity) ffl System hardware maintenance and diagnosis – FDDI loop – Peripherals – Monitors ffl Backup of critical data

– Want to redefine set of disks ffl E-mail and network access ffl Consultation/assistance on hardware purchases – expedite orders – install new peripherals ffl access to modem pool and printers ffl Consultation on security issues

New Projects

Have a number of outstanding projects:

ffl Installation and testing of MBONE – Do we have necessary bandwidth to FNAL/CERN?

ffl Become ASF client site for HEP software

ffl Complete unification of cluster

– unified password file – common login directories from all machines – sharing of all disks and tapes?