PYTHIA Z 5 bb: Mass Reconstruction

Constant 2367. Mean 90.01 Sigma 12.27

All Corrections μ and Missing E_T Corrections μ Corrections Standard Corrections

Dijet Invariant Mass (GeV/c^2) 0

500

1000

1500

2000

2500

20 40 60 80 100 120 140