10^{-1}

1

10

10^2

100 150 200 250 300 350 400 M_{γγ}, GeV dσ^{95}/dM_{γγ}, fb/GeV

2 TeV, 0.1 fb^{-1}

Run IIa, 2 fb^{-1}

Run IIb, 30 fb^{-1}