IPP Offline Activities

Have a long list of offline tasks

1. Management of CDF Offline group (PKS - 0.5 FTE) 2. CDFSIM (Sganos) 3. Geometry (Ragan) 4. Bank dump code - BNK (Sganos) 5. Physics Utilities - PU and UTI (Warburton) 6. DF (Warburton) 7. Generator area (PKS)

Have to reexamine list of responsibilities for Run II

ffl Can’t be stretched too thin ffl Can’t just drop these either

One Proposed Plan

List of tasks is probably too large at the moment

ffl Have to prioritise tasks ffl identify which ones are already orphans – CDFSIM – BNK – Generator (maybe) ffl Which ones are one their way...

– DF and Utilities?

Address our offline involvement for Run II ffl Have to redesign offline system ffl No more VMS ffl Integrate non-FORTRAN/77 languages