Monte Carlo

Events/(25 GeV/c^2)

Standard Model Top (M_{TOP}=175GeV/c^2)

W + Jets Background

Reconstructed Mass of ttbar (GeV/c^2)

Topcolor Z´ M_{Z´}=500 GeV/c^2