 Run 69519 Evt 430034   E.TOP.GAMMA]R69519_430034.DST   2JUN95 20:34:09 18-SEP-95

  Pt   Phi   Eta
z_1= -31.8, 26 trk
  88.0 214 -0.81 E
  71.0  344  0.17
 -39.4  249 -0.40
 -14.7   70 -0.06
 -10.9   68 -0.12
 -10.2   94  0.65
  -7.0  250 -0.44
   6.0   60 -0.21
  -3.7  243 -0.40
   3.7   66 -0.12
  -3.4   98  0.63
   3.2  100  0.65
  -1.8   52 -0.94
   1.6  249 -0.43
   1.5   65  0.07
   1.2  235 -0.35
  -1.1  254 -0.65
   1.1  250 -0.70
   1.0  105  0.83
   0.9   67 -0.97
   0.9  281 -1.31
  -0.7   35 -1.23
  -0.6  221 -0.33
  -0.4  137 -1.18
   0.4  241 -0.43
   0.3   33 -1.13
   0.3  295 -1.11
z_3=  -4.0,  2 trk
  81.6 214 -0.92 E
z_4= -13.2,  1 trk
 17 unattchd trks
  2 rejectd trks

 22 more trks...
 hit & to display PHI:

                                                                        ETA:

                                                                               344.

                                                                               0.17

                                                      Emax =  125.8 GeV

                      CMX west

                      CMX east

                   Et(METS)=  71.2 GeV

                   /
                       Phi =   4.0 Deg
                    Sum Et = 274.9 GeV