Mass and Statistical Uncertainty Expected for Various Samples from Monte Carlo Experiments

CDF Preliminary

Subsample Median Mass Stat. Uncertainty GeV/c^2 GeV/c^2 SVX or SLT tag 175.1 6.4 (Standard Method) No tag (E_t ¿ 15) 174.3 11.6 SVX single tag 175.7 8.7 SVX double tag 175.4 9.7 SLT tag (No SVX) 175.3 12.1 Optimization Method 175.3 5.4

Mass and Statistical Uncertainty for Various Samples in 110 pb�^1 Data

CDF Preliminary

Subsample Fitted Mass Stat. Uncertainty GeV/c^2 GeV/c^2 SVX or SLT tag 175.6 5.7 (Standard Method) No tag (E_t ¿ 15) 180.9 6.4 SVX single tag 176.3 8.2 SVX double tag 174.3 7.9 SLT tag (No SVX) 140.0 24.1 Optimization Method 176.8 4.4