1

2 3 4 5 6 7 8 9 10

20 30

160 180 200 220 240

Top Mass (GeV/c^2) σ (pb)

CDF Combined SVX+SLT+DIL Measurement

Theory: Catani, Mangano, Nason and Trentadue CERN-TH/96-21

CDF PRELIMINARY