93-94 94-95 95-96 96-97 97-98
Faculty  1.4  1.4  1.0  0.5  0.2
RA  2.0  2.0  2.0  1.0  1.0
Students  6  6  6  3  2
Operating 180 240 200 150  50
Equipment 70  100  50  10  0