Run 1b Weekly Lum Chart 113Page 1Run IB Integrated Luminosity July 94 - Jan. 95 (pb-1) 0102030405060

7/4/94

7/11/94

7/18/94

7/25/94

8/1/94

8/8/94

8/15/94

8/22/94

8/29/94

9/5/94

9/12/94

9/19/94

9/26/94

10/3/94

10/10/94

10/17/94

10/24/94

10/31/94

11/7/94

11/14/94

11/21/94

11/28/94

12/5/94

12/12/94

12/19/94

12/26/94

1/2/95