Figure 10: Event display for one of the eμ events; (a) displays the observed calorimeter ET in the η � ϕ plane, (b) shows the reconstructed CTC tracks and muon hits in the

r � ϕ plane, and (c) shows a similar display for the reconstructed SVX tracks. The

jet with the displaced vertex is enlarged on the right half of c). Extranious tracks have been removed from the enlargement. Dashed tracks in the enlargement form the displaced vertex. The rack lenths in the complete SVX display are proportional to their PT .