CMP SOLENOID RETURN YOKE

CMU CHA CEM CES CPR

SOLENOID CDT CTC VTX SVX PEM

WHA

PHA

CMX

BBC FEM FHA

FMU

BEAMLINE INTERACTION REGION

1 METER

CDF_{θ ϕz}^y_{x(EAST)}