0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45

0 50 100 150 200 250 300

GENP P_T For Precut And W4JFLT Mass Pretag Samples

P_t

PRETAG Dashed Distribution is GENP

P_t

Single TAG Dashed Distribution is GENP

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45

0 50 100 150 200 250 300