0

20

40

60

80

-250 0 250 0

20

40

60

80

-250 0 250

ID Entries Mean RMS

101 400 -7.029 44.77

ID Entries Mean RMS

101 400 -2.698 40.96

ID Entries Mean RMS

101 400 -0.4837E-01 39.51

0 20 40 60 80

-250 0 250