Figure 37: CHA energy for muon candidates which are identified both in the CMU and CMP detectors (solid) and for muon candidates identified in just the CMU detector (dashed). The muon candidates populating the high-energy tail in the CMU-only distribution are due to hadrons which punch through the calorimeter.