 Run 57621 Event45230   emu1994_57612ab.dst            26MAR94 19:48:56 18-Apr-9

  Pt   Phi   Eta
z_1=-10.8, 28 trk
  48.9 339  0.77
  49.9  339  0.77
  27.6  258  0.61
 -26.7  115 -0.48
  -9.4  192 -0.32
   6.6  249  0.45
  -4.5  245  0.45
   3.1  254  0.57
   2.5  196 -0.28
   1.9  253  0.68
  -1.7  181 -0.59
  -1.6  312 -0.74
  -1.4  293  0.71
  -1.3   27 -1.24
   1.3  165 -0.35
   1.1  282 -0.63
  -1.0  263  0.34
  -0.9  296 -0.11
  -0.7  316  0.72
   0.6  293 -1.28
   0.6  249  0.37
  -0.5  131 -0.29
   0.5  167 -0.46
   0.5   16 -1.63
   0.4   80 -1.43
  -0.4   56  0.21
  -0.4  299 -0.61
   0.3  311 -0.70
  -0.3   45 -0.87
 15 unattchd trks
  -4.6  256  0.51
  -3.1  259  0.54

 13 more trks...
 hit & to display PHI:

                                                                      ETA:

                                                                              339.

                                                                              0.77

                                                             Emax =   65.4 GeV

                   Et(METS)=  49.8 GeV

                   /
                       Phi = 107.5 Deg
                    Sum Et = 128.0 GeV