b TAG EFFICIENCY

RUN 1A RUN 1B

RUN 1A

RUN 1B

22 g 4 % 1.15 g .04

1.25 g .05

1.17 g .06

42 g 5 %

MC b Baryon Lifetime

New Algorithm

New Detector