H_T (GeV)

Unit-Normalized H_T Distributions for Signal and Background

0

0.02

0.04

0.06

0.08

0.1

0.12

0 50 100 150 200 250 300 350 400 450 500

CDF Preliminary

Wg signal W* signal QCD background tt background

Events/(10 GeV/c^2)

H_T (GeV)