0 10 20 30 40 50

0 0.25 0.5 0.75 1 0 10 20 30 40 50 60

0 0.25 0.5 0.75 1

0 10 20 30 40 50 60 70 80 90

0 0.2 0.4

Outcome of Monte Carlo Experiments ID Entries Mean RMS

1000000 1000 0.3946 0.1742

R_1

ID Entries Mean RMS

1000000 1000 0.4225 0.1821

R_2 ID Entries Mean RMS

1000000 1000 0.1486 0.9611E-01

R_3

ID Entries Mean RMS

1000000 1000 0.3559E-01 0.3499E-01

R_4 0 50 100 150 200 250 300 350

0 0.1 0.2