80 80.1

80.2

80.3

80.4

80.5

80.6

80.7

80.8

80.9

140 150 160 170 180 190 200 210 220

LEP+SLC Indirect Data

CDF Measurements: M_W = 80.375 Α 0.120 GeV/c^2 M_{top}= 175.9 Α 6.9 GeV/c^2

M_{top} (GeV/c^2)

M_W (GeV/c^2)