0 1000

2000

3000

4000

-0.5 -0.25 0 0 1000

2000

3000

4000

-0.5 -0.25 0

0

1000

2000

3000

-0.5 -0.25 0

Negative Errors for 5 Parameter Fit 4 Par 5 Par

0 1000

2000

3000

4000

-0.5 -0.25 0