 Run 40758 Event44414   DKA100:[DAGWOOD.DATA]W_52.PAD  24SEP92  5:02:46 28-FEB-95

                                                                        X  0.661 c

                                                                        Y  0.458 c

                                                                        Pt MAX 5 G

                                                                        PV     0.02
                                                                               0.02
                                                                             -16.31