0.44 g 0.28 events 0.38 g 0.07 events 0.23 g 0.15 events 0.21 g 0.07 events 0.03 g 0.02 events Total Background 1.3 g 0.3 events Dilepton Backgrounds Observe 6 P = 0.33 % (2.7 s ) events From data From Monte Carlo