0

1

2

3

4

5

6

5 10 15 20 25

σ (pp^_ 5 tt^_) (pb)

CDF PRELIMINARY

10.7_{-4.0}^{+7.6} pb

9.3_{-3.4}^{+4.4} pb

8.0_{-3.6}^{+4.4} pb

6.8_{-1.8}^{+2.3} pb

7.5_{-1.6}^{+1.9} pb SVX+SLT+DIL

SVX

SLT

DIL

HAD